Filtering Half Masks FFP3

Filtering Half Masks FFP3

Description:
Filtering half masks of class FFP3, Category III Personal protective equipment (PPE). Certified according to EN 149:2001+A1:2009, with EU
type examination according to regulation (EU) 2016/425. Meet the requirements of the additional dolomite clogging test (D). Anatomical fits
for highest possible wearing comfort and maximum protection through very low leakage.

Filtering Half Mask FFP3 NR D
REF: HHY-HY9330
Characteristics:
• Ergonomic, not reusable (NR) folding mask
• Foldable und expandable for good adaptation to
different face shapes
• Without exhalation valve: maximum protection for
mask wearers and third persons
• Meets the requirements of class FFP3 NR D
acc. EN 149:2001+A1:2009
• Low breathing resistance and very low total
inward leakage (TIL)
• Inner padded nose piece
• Made from multiple layers of PP spunbond and PP
meltblown for optimal filtration performance
• SU = 20 pcs. I per carton 20 SU = 400 pcs.

The post Filtering Half Masks FFP3 appeared first on pharmaqatar.