Filtering Half Mask FFP3 R D, with Exhalation Valve

Filtering Half Mask FFP3 R D, with Exhalation Valve

Characteristics:
• Dimensionally stable, reusable (R) cup-shaped mask
• Good adaptation to different face shapes thanks to the soft inner
lining and internal PU foam seal in the nose area
• Easier breathing thanks to exhalation valve
• Meets the requirements of class FFP3 R D
acc. EN 149:2001+A1:2009
• Low breathing resistance and very low total inward leakage (TIL)
• Flexible nose piece and adjustable, elastic head bands
• Made from multiple layers of PP filtering material for optimal
filtration performance
• SU = 10 pcs. I per carton 36 SU = 360 pcs.

The post Filtering Half Mask FFP3 R D, with Exhalation Valve appeared first on pharmaqatar.